Z [cm]

-80 -60 -40 -20 0 20 40 60 80 compatible hits

0 1 2 3 4 5 6 method I

Z [cm]

-80 -60 -40 -20 0 20 40 60 80

P Π

-12 10 -11 10 -10 10 -910

-810

-710

-610

method II