vZ -60 -40 -20 0 20 40 60

Fraction of events

0 0.2 0.4 0.6 0.8 1 a)

vZ -60 -40 -20 0 20 40 60

Fraction of events

0 0.2 0.4 0.6 0.8 1 b)

vZ -60 -40 -20 0 20 40 60

Fraction of events

0 0.2 0.4 0.6 0.8 1 c)