T N/dydp 2 >) d

part <N T pπ1/(

10^{-2}

10^{-1}

1

10

-2 10^{-1}10 1

±π

HIJING RQMD Thermal [7] PHENIX 130 GeV

(GeV/c) 0-m Tm

±K

-2 10^{-1}10 1 p p+

-2 10^{-1}10 1