0.5 1 1.5 2 = 1 GeV/c Tp

5 10 15 0 0.5 1 1.5 = 3 GeV/c Tp

= 2 GeV/c Tp

5 10 15 20

= 4 GeV/c Tp

〉 coll N〈

dAu R