-0.5

0

0.5 EOct/ERing

Ratio

DATA HIJING

EToT/ERing d+Au 200 GeV

-4 -2 0 2 4

-0.5

0

0.5 EAuHem/ERing

η

Ratio

-4 -2 0 2 4

EdHem/ERing

η