ηd ch dN

1 2 3 4

10 20

ηd ch dN

1 2 3 4

10 20

ηd ch dN

1 2 3 4

10 20

ηd ch dN

1 2 3 4

10 20

ηd ch dN

1 2 3 4

10 20

Peripheral Central

EOct ERing ETot EdHem EAuHem

-4 -2 0 2 4η -4 -2 0 2 4η d+Au 200 GeV