EOct (arb units)

0 1000 2000 3000

Counts

1 10 210 310 (a) Au+Au 200 GeV

Paddle Mean (arb units)

0 500 1000150020002500

Counts

1 10 210 310 (b) Au+Au 200 GeV

EOctRed (arb units)

0 200 400 600 800

Counts

1 10 210 310 410 (c) Au+Au 19.6 GeV

EOctPdlgon (arb units)

0 50 100 150 200 250

Counts

1 10 210 310 410 (d) Au+Au 19.6 GeV