20

40 E895 (AGS) =3.0 GeV NNs

50

100 E895 (AGS) =4.1 GeV NNs Measured Data Gaussian Fit

-5 0 5

100 200 300^{NA49 (SPS)} =17.3 GeV NNs Reflected About y=0

E895 (AGS) =3.6 GeV NNs

NA49 (SPS) =8.8 GeV NNs

-5 0 5

BRAHMS (RHIC)

=200 GeV NNs Rapidity

+π dN/dy of