ϕΔ -100 0 100

)ϕΔ ) / b( ϕΔs(

1 1.005

1.01

1.015

0-10% < -2ηΔ-4 <

-2 0 2 ϕΔ -100 0 100

)ϕΔ ) / b( ϕΔs(

1 1.005

1.01

1.015

0-10% < 1ηΔ-1 <

-2 0 2