]^2

[GeV/c Tm 0 1 2 3

]^2 [GeV/c locT

0.2 0.4

]^2 /GeV

4 [c_T

N/dydm 2 d^{-1})_Tmπ(2

10^{-1}

1

10

10^2

10^3 )^-π+^+π(

)^-+K + (K )p (p+

PHOBOS

PHENIX