(GeV/c) Tp 0.5 1 1.5

% Correction

-5

0

5 prim /p absorbed p prim /p secondary p prim +π/ feeddown +π

(GeV/c) Tp 0.5 1 1.5

% Correction

-5

0

5 prim p/ absorbed p prim -π/ feeddown -π p