ϕΔ 0 100 200

)ϕΔ R(

-1 -0.5 0 0.5 1^{p+p 200 GeV}

PHOBOS PYTHIA

ϕΔ 0 100 200

p+p 410 GeV

PHOBOS PYTHIA