ηΔ

-5 0 5

ϕΔ

0 100 200

)ϕΔ,ηΔR(

-2 0 2 4

a) final p+p data 200 GeV ηΔ

-5 0 5

ϕΔ

0 100 200

)ϕΔ,ηΔR(

-2 0 2 4

b) final p+p data 410 GeV

)ϕΔ,ηΔR(

-2 0 2 4

ηΔ -5 0 5

ϕΔ

0

100

200

)ϕΔ,ηΔR(

-2 0 2 4

ηΔ -5 0 5

ϕΔ

0

100

200