ηΔ

-5 0 5

ϕΔ

0 100 200

)ϕΔ,ηΔ(^{data}_{raw}R

0 5 10 15 20

a) raw data 200 GeV

ηΔ

-5 0 5

ϕΔ

0 100 200

)ϕΔ,ηΔS(

0 5

b) PYTHIA 200 GeV

ηΔ

-5 0 5

ϕΔ

0 100 200

)ϕΔ,ηΔ(^{data}_{final} R

0 5 10

c) final data 200 GeV