ηΔ

-5 0 5

ϕΔ

0 100 200

)ϕΔ,ηΔ(^{MC}_{pri}R

-2 0 2 4 a) PYTHIA 200 GeV, primary tracks

ηΔ

-5 0 5

ϕΔ

0 100 200

)ϕΔ,ηΔ(^{MC}_{sim}R

0 5 10 b) PYTHIA 200 GeV with GEANT