(GeV) NN 1/2s

10 10^2 10^3

> part N 2 1/< |<1 η||η/d_{ch} dN

0 1 2 3 4 5

(s)^2

2.5 - 0.25 ln(s) + 0.023 ln

PHOBOS 200 GeV RHIC comb. 130 GeV PHOBOS 56 GeV NA49 (SPS) E866/E917 (AGS) )p UA5 (p )p CDF (p