> part N 2 1/< |<1 η||η/d_{ch} dN 1 2 3 4

PHOBOS 56 GeV [6]

PHENIX 130 GeV [20]]

Brahms 130 GeV (prel.) [21]

STAR 130 GeV [22]

PHOBOS 130 GeV [6,18,19]

PHOBOS 200 GeV