2 4 6

2 4 6

2 4 6

0.2 0.3 0.4 0.5 0.6 0.7 0 0.5 1 1.5

0.2 0.3 0.4 0.5 0.6 0.7

= 200 GeV

NNs = 62.4 GeV NNs

(GeV/c)

Tk (GeV/c) Tk

(fm) oR (fm) sR (fm) lR s/R_oR