η -5 0 5

η/d ch dN

0

100

200

300

400 19.6 GeV η/d ch dN

0

200

400

600 130 GeV η/d ch dN

0

200

400

600

800 200 GeV

0- 6% 6-15% 15-25%

25-35% 35-45% 45-55%