-4 -2 0 2 4 0

0.02

0.04

0.06

0.08

0.1 2v

η η

Central (3-15%)

Peripheral (25-50%) Mid-central (15-25%)

-2 -1 0 1 2 1.5

2

2.5

Peripheral/Central