0 50 100 150 200 250 300 350 0 0.01

0.02

0.03

0.04

0.05

0.06

0.07

0.08

0.09

0.1 Track-based 200 GeV Au+Au

Hit-based 200 GeV Au+Au Hit-based 130 GeV Au+Au Hydrodynamic calculation

> part <N

2v