R 0 0.5 1

α

1

1.5 = 0 bkg 100, f ≥2N 1≥ _{bkg}

100, f ≥ 2 N 0≥ _{bkg}

= 50, f 2 N 0≥ _{bkg}

25, f ≤ 2 N