2v

0.02

0.04

0.06

0.08 (a)

〉_{std}ε〈/_2v

0.5

1

1.5 ±h 200GeV Au-Au ±h 62.4GeV Au-Au ±h 200GeV Cu-Cu ±h 62.4GeV Cu-Cu

(b)

part N 0 100 200 300

〉 partε〈/2v

0.1

0.2

0.3

0.4 (c)