AA R

0.5 1 1.5 2 45-50%

200 GeV

(GeV/c) Tp 2 4 6

AA R

0 0.5 1 1.5 2 45-50%

62.4 GeV

35-45%

(GeV/c) Tp 2 4 6

Cu+Cu: 35-40%

35-45%

25-35%

(GeV/c) Tp 2 4 6

25-35%

15-25%

(GeV/c) Tp 2 4 6

15-25%

6-15%

(GeV/c) Tp 2 4 6

6-15%

0-6% PHOBOS Cu+Cu PHOBOS Au+Au

(GeV/c) Tp 2 4 6

0-6%