AA R

0.5

1

1.5 = 0.25 (GeV/c) Tp = 200 GeV NNs

AA R

0.5

1

1.5 = 2.5 Tp

partN

10^210

AA R

0.5

1

1.5 = 4.25 Tp

= 0.55 Tp

= 3.38 Tp

part N 10^210

= 5.25 Tp

= 1.25 Tp

PHOBOS Cu+Cu PHOBOS Au+Au PHENIX Au+Au

= 3.88 Tp

part N 10^210

= 6.25 Tp PQM (Cu+Cu)

PQM (Au+Au)