η -4 -2 0 2 4 η/d_{ch} dN

0

50

100 22.4 GeV Cu+Cu

η/d ch dN

50

100

150^{62.4 GeV Cu+Cu}

η/d_{ch} dN

50 100 150 200 200 GeV Cu+Cu

0- 6% 6-15% 15-25%

25-35% 35-45% 45-55%