/2)〉

part

N〈/(η/d_{ch} dN

2

3

4

=200 GeV NNs PHOBOS =130 GeV NNs PHOBOS

=200 GeV NNs UA5

interpolation 130 GeV pp = 0.25 ) λ Saturation Model ( Two-component Fit

a)

part N 0 100 200 300 400

Ratio

1.1 1.2 200/130

PHOBOS R interpolation pp b)