1v

-0.15

-0.1

-0.05 0 0.05 0.1 0.15 > = 201

part

= 19.6 GeV <N

NNs > = 201_{part}

= 62.4 GeV <N NNs

η -4 -2 0 2 4

1v

-0.04

-0.02 0 0.02

0.04^{> = 209}

part

= 130 GeV <N NNs

η -4 -2 0 2 4

> = 211

part

= 200 GeV <N NNs