1v

-0.15

-0.1

-0.05 0 0.05 0.1 0.15^{= 19.6 GeV 15-35% Centrality}

NNs = 62.4 GeV 6-40% Centrality NNs

Mixed Harmonic Method Symmetric Subevent Method

η -4 -2 0 2 4

1v

-0.04

-0.02 0 0.02

0.04^{= 130 GeV 6-40% Centrality} NNs

η -4 -2 0 2 4

= 200 GeV 6-40% Centrality NNs