1 2^{= 1 GeV/c} Tp PHOBOS STAR PHENIX BRAHMS_0 π PHENIX 0π WA98 Blattnig Wang WA98

10 10^2 0 1 2

0

= 3 GeV/c Tp

= 2 GeV/c Tp

10 10^2

WA98

= 4 GeV/c Tp

(GeV) NNs

AA R