〉 part N〈 0 100 200 300 400 ηd ch (p+p) dN ηd ch (Au+Au) dN 〉 part N〈 2

1.5

1.0

2.0 0 200 400 2 4 6_{200 GeV}

19.6 GeV

Collision

Scaling

19.6 GeV

200 GeV

Participant Scaling