eff ∞|<η| K

2

4

6

8 )^o<180ϕΔ<^o

Inclusive (0 (a)

0σ/σ1- 0.6 0.7 0.8 0.9

∞|<η| δ

0.0

0.5

1.0

1.5

2.0 (d)

)^o <90 ϕΔ<^o Near-side (0 (b)

0σ/σ1- 0.6 0.7 0.8 0.9

(e)

)^o

<180 ϕΔ<^o Away-side (90 (c)

0σ/σ1- 0.6 0.7 0.8 0.9 1.0

PHOBOS p+p 200 GeV PHOBOS Cu+Cu 200 GeV PHOBOS Au+Au 200 GeV AMPT Cu+Cu 200 GeV AMPT Au+Au 200 GeV

(f)