|<3 η| δ 0.0 0.5 1.0

Ratio

0.0

0.2

0.4

0.6

0.8

1.0 (a) -1 eff ∞|<η|K -1 eff |<3 η|K

|<3 η| δ 0.5 1.0

(b) ∞|<η| δ |<3 η| δ

ICM K=2.00 ICM K=3.00 ICM K=4.00 ICM K=5.00 HIJING AuAu HIJING CuCu AMPT AuAu AMPT CuCu PYTHIA