ηΔ

-5 0 5

(deg) ϕΔ

0 100 200

)ϕΔ,ηΔR(

-2 0 2

(a) Independent Cluster Model

ηΔ -5 0 5

)ηΔ R(

-2 0 2 4 6 (b) <3 η -3< Full acceptance