-2 0 2 4 40-50%

Data Cluster fit (a)

-5 0 5 -2 0 2 4 40-50% (f)

30-40% (b)

-5 0 5

30-40% (g)

20-30% (c)

-5 0 5

20-30% (h)

10-20% (d)

-5 0 5

10-20% (i)

0-10% Cu+Cu 200 GeV (e)

-5 0 5

0-10% Au+Au 200 GeV (j)

)ηΔ R( ηΔ