% Phobos acknowledgements and funding credits
%
% Last edited 26-Feb-2004 by George Stephans
%
% For expanded acknowledgements, you can uncomment some or all of the following
%
% We acknowledge the generous support of the Collider-Accelerator Department
% (including RHIC project personnel) and Chemistry Departments at BNL.  We
% thank Fermilab and CERN for help in silicon detector assembly.  We thank the
% MIT School of Science and LNS for financial support.  
%
This work was partially supported by U.S. DOE grants 
DE-AC02-98CH10886,
DE-FG02-93ER40802, 
DE-FC02-94ER40818,  % MIT
DE-FG02-94ER40865, 
DE-FG02-99ER41099, and
W-31-109-ENG-38, by U.S. 
NSF grants 9603486, % Phobos TOF 
0072204,            % Rochester until 6/03
and 0245011,        % Rochester starting 6/03
by Polish KBN grant 2-P03B-10323, and
by NSC of Taiwan Contract NSC 89-2112-M-008-024.
