% Phobos acknowledgements and funding credits
%
% Last edited 5-Aug-2002 by George Stephans
%
% For expanded acknowledgements, you can uncomment some or all of the following
%
% We acknowledge the generous support of the Collider-Accelerator Department
% (including RHIC project personnel) and Chemistry Departments at BNL.  We
% thank Fermilab and CERN for help in silicon detector assembly.  We thank the
% MIT School of Science and LNS for financial support.  
%
This work was partially supported by U.S. DOE grants DE-AC02-98CH10886,
DE-FG02-93ER40802, DE-FC02-94ER40818, DE-FG02-94ER40865, DE-FG02-99ER41099, 
and W-31-109-ENG-38, US NSF grants 9603486, 9722606 and 0072204, Polish KBN 
grant 2-P03B-10323, and NSC of Taiwan contract NSC 89-2112-M-008-024.
