-6 -4 -2 0 2 4 6 0 0.5 1 1.5 2 2.5 3 3.5

Eta dN_ch/dEta/( of participants / 2)

All Phobos detectors, nPart = 327 +- 25 Centrality Bin 16 E=130 GeV

red point = analogue

circle : hit counting