-1 -0.8 -0.6 -0.4 -0.2 -0 0.2 0.4 0.6 0.8 1 0 5 10 15 20 25 30 35 40 45 ny

Nent = 457 Mean = -0.2481 RMS = 0.114 ny SpectMainVertex.vy

Data 20 GeV