-1 -0.8 -0.6 -0.4 -0.2 -0 0.2 0.4 0.6 0.8 1 0 10 20 30 40 50 60 nx1 Nent = 457 Mean = -0.1046 RMS = 0.06305

SpectMainVertex.vx

Data 20 GeV