9197 9198 9199 9200 9201 9202 9203 9204 0 20 40 60 80 100 120 140 160 180 200 htemp Nent = 457 Mean = 9200 RMS = 2.018

Info.Run_{htemp}

Run vs number of events

Data : 20 GeV