0 100 200 300 400 500 0

20

40

60

80

100 Black histogram : data 200 GeV Blue histogram : data 130 GeV Red histogram : data 20 GeV All Ring Counters Centrality ~ 6 %

Energy Deposit (keV)

Entries/Events