-8 -6 -4 -2 0 2 4 6 8

η/d ch dN

0 20 40 60 80 100 120 140

45-55% a)

Peripheral

-8 -6 -4 -2 0 2 4 6 8 0

50

100

150

200

35-45% b)

-8 -6 -4 -2 0 2 4 6 8 0 50 100 150 200 250 300

25-35% c)

η -8 -6 -4 -2 0 2 4 6 8

η/d ch dN

0

100

200

300

400

500

15-25% d)

η -8 -6 -4 -2 0 2 4 6 8 0 100 200 300 400 500 600

6-15% e)

η -8 -6 -4 -2 0 2 4 6 8 0 100 200 300 400 500 600 700

0-6% f)

Central