Gauss Gauss Gauss

-400

-200

0

200

400

X (in)

-10 -5 0 5 10 15 20 25 30

Z (in)

0

10

20

30

40

50

60

70 Bx^{Gauss}

0

5000

10000

15000

20000

X (in)

-10 -5 0 5 10 15 20 25 30

Z (in)

0

10

20

30

40

50

60

70 By

-500

-400

-300

-200

-100

0

100

200

300

400

X (in)

-10 -5 0 5 10 15 20 25 30

Z (in)

0

10

20

30

40

50

60

70 Gauss Bz