/pp 0.0 0.2 0.4 0.6 0.8 0.2

0.4

0.6

0.8

1.0

+K -K BRAHMS (200 GeV) BRAHMS (130 GeV) NA49 (17 GeV) NA44 (17 GeV) E866 (5 GeV) Becattini et. al

Bμ (T=170MeV)

255 137 78 43 19 0