centrality [%]

5 10 15 20

0.5

1.0 (b)

[GeV/c] Tp 0 1 2

Ratio

0.5

1.0

+π/^-π +/K^-K /pp

(a)

[GeV/c] Tp 0.5 1.0 1.5

(c)

centrality [%]

5 10 15 20

(d)

0.5

1.0

y=0 2≈y