[GeV/c] Tp 0.5 1 1.5 2 2.5 3

+π p /

-1 10 centrality 0-10 % 0≈η Au+Au @ 62.4 GeV, 2.2 ≈η Au+Au @ 200 GeV, 0≈η p+p at 62.4 GeV,