[GeV/c] Tp 1 2 3 4 5

positive negative y=3.3

[GeV/c] Tp 1 2 3 4 5

-810

-610

-410

-210

1 P

]^3c^{-2} [mb(GeV) dy_Tdp σ^2d T pπ2 1

-710

-610

-510

-410

-310

-210

-110 K

-710

-510

-310

-110

y=2.95 π