η dN/d

0 5 10 15 20 25

0-30% a)

Min. Bias

η

0 5 η dN/d

0 2 4 6 8 10 12 14 16 18 20

30-60%

60-80% b) η

0 2 4 6 8

η -6 -4 -2 0 2 4 6

R

0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 c)c)

η

R

1