/pp -3 10^{-2}10^{-1}10

πK/

0.1

0.2

BRAHMS

+π/^+K BRAHMS

-π/^-K SPS (y=0)

+π/^+K SPS (y=0)

-π/^-K

AMPT 1.11 (62.4 GeV) UrQMD 2.3 (200 GeV) UrQMD 2.3 (62.4 GeV) UrQMD 2.3 (17.3 GeV)